<template>
    <div v-if="!userLoaded" class="bg-neutral-100 dark:bg-neutral-900 text-primary h-screen flex flex-col">
        Loading
    </div>
    <div v-else>
        <div v-if="isAuthenticated" class="bg-neutral-100 dark:bg-neutral-900 text-primary h-screen flex flex-col">
            <LayoutTopbar />
            <div class="overflow-y-auto pt-3">
                <NuxtPage />
            </div>
            <LayoutNavbar class="mt-auto" />
        </div>
        <div v-else class="bg-neutral-100 dark:bg-neutral-900 text-primary h-screen flex flex-col">
            <Login />
        </div>
    </div>
</template>

<script setup>
import { doc, getFirestore, serverTimestamp, writeBatch, collection, getDocs } from "firebase/firestore";
import { getAuth, onAuthStateChanged, signInWithEmailAndPassword } from "firebase/auth";

const db = getFirestore()
const route = useRoute()

const isAuthenticated = ref(false)
const user = ref('frikandel')
const auth = ref(null)
const userLoaded = ref(false)

onMounted(() => {
    auth.value = getAuth()

    onAuthStateChanged(auth.value, (usr) => {
        if (usr) {
            isAuthenticated.value = true
            user.value = usr
        } else {
            isAuthenticated.value = false
            user.value = null
        }

        userLoaded.value = true
    })
})

const ledenlijst = ref([])


provide('firebase', { db, ledenlijst, isAuthenticated, user, auth })
</script>